E-150 Work Schedule D.R. Walz 10-10-97 Rev. 4-16-99

(B) BEAM DIAGNOSTICS Task Person Account 4/5 4/12 4/19 4/25 5/3 5/10 5/17 5/24 Design Wire Scanner Probes Kirby Complete Probe Fabrication Kirby Complete Wire Scanner Installation in P. Chamber Kirby Software T. King Bremssstrahlung Diagnostics Weidemann/Field Electronic Interface Design Angelov/Anthony Electronic Interface Procure Angelov/Anthony Electronic Interface Installation EFD ?

(C) VACUUM INSTRUMENTATION Specify System Craddock Procure Hardware Craddock Assemble & Installation Kaminskas

(D) LASER & OPTIC TRANSPORT Design Optical Transport Rogers Procurement Rogers/Walz Fabrication Assembly EFD/Rochester Installation IP-1 to FP Vogelsang Laser Transport Alignment T. King Laser Transport Alignment Meyerhofer Laser Safety Review Kotseroglou/Fieguth Ship Laser from Rochester Meyerhofer Complete Optical Components Procurement Crawford Laser Installation in 407B Kotseroglou/Crawford Laser Checkout in 407B Meyerhofer Laser Transport Checkout Meyerhofer Install Mirrors & Lenses near FP Install Laser Safety Shrouds Vogelsang

Page 2

E-150 Work Schedule D.R. Walz

10-10-97

Rev. 4-16-99

Page 2

E-150 Work Schedule D.R. Walz 10-10-97 Rev. 4-16-99

Page 2

E-150 Work Schedule D.R. Walz

10-10-97

Rev. 4-16-99

Page 2