954. 956. 958. 960. 962. 964. 966. 968. 970. 972. 974. s (m) δE/ p 0c = 0. Table name = TWISS

Sector 10 Chicane (e-) FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0

10.

20.

30.

40.

50.

60.

β (m)

0.0 0.05

0.10

0.15

0.20

0.25

0.30

0.35

0.40

0.45

0.50

D (m) β x β y Dx Dy

0.0 200. 400. 600. 800. 1000. 1200. 1400. 1600. 1800. 2000. s (m) δE/ p 0c = 0. Table name = TWISS

NRTL + Linac + LI20 FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0 2. 4. 6. 8. 10. 12. 14. 16. 18. 20. 22.

E[GeV]

�

0.0 200. 400. 600. 800. 1000. 1200. 1400. 1600. 1800. 2000. s (m) δE/ p 0c = 0. Table name = TWISS

NRTL + Linac + LI20 FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0 25. 50. 75. 100.

125.

150.

175.

200.

225.

250.

β (m) β x β y

0.0 200. 400. 600. 800. 1000. 1200. 1400. 1600. 1800. 2000. s (m) δE/ p 0c = 0. Table name = TWISS

NRTL + Linac + LI20 FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

-1.6

-1.4

-1.2

-1.0

-0.8

-0.6

-0.4

-0.2 0.0 0.2 0.4 0.6

D (m)

Dx Dy

1550. 1600. 1650. 1700. 1750. 1800. 1850. 1900. 1950. s (m) δE/ p 0c = 0. Table name = TWISS

LI17-LI19 + LI20 Chicane FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0 20. 40. 60. 80. 100.

120.

140.

160.

180.

200.

β (m) β x β y

1880. 1890. 1900. 1910. 1920. 1930. s (m) δE/ p 0c = 0. Table name = TWISS

LI20 Chicane FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0 20. 40. 60. 80. 100.

120.

140.

160.

180.

200.

β (m) β x β y

1880. 1890. 1900. 1910. 1920. 1930. s (m) δE/ p 0c = 0. Table name = TWISS

LI20 Chicane FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

-0.5

-0.4

-0.3

-0.2

-0.1 0.0 0.1 0.2

D (m)

Dx Dy

1880. 1890. 1900. 1910. 1920. 1930. 1940. 1950. 1960. 1970. 1980. s (m) δE/ p 0c = 0. Table name = TWISS

LI20 FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0 25. 50. 75. 100.

125.

150.

175.

200.

225.

250.

β (m) β x β y

1880. 1900. 1920. 1940. 1960. 1980. s (m) δE/ p 0c = 0. Table name = TWISS

LI20 FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

-0.5

-0.4

-0.3

-0.2

-0.1 0.0 0.1 0.2

D (m)

Dx Dy

1930.0 1935.0 1940.0 1945.0 1950.0 s (m) δE/ p 0c = 0. Table name = TWISS

LI20 FF + Experimental Area FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0 20. 40. 60. 80. 100.

120.

140.

160.

180.

β (m) β x β y

1930.0 1935.0 1940.0 1945.0 1950.0 s (m) δE/ p 0c = 0. Table name = TWISS

LI20 FF + Experimental Area FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

-1.00

-0.75

-0.50

-0.25 0.0 0.25

0.50

0.75

1.00

D (m) [*10**( - 3)]

Dx Dy

1945.0 1950.0 1955.0 1960.0 1965.0 1970.0 s (m) δE/ p 0c = 0. Table name = TWISS

WAISTS to IPIMAGE FACET e- (v34): NRTL-LI20 Unix version 8.52/0s 26/02/15 14.30.23

0.0 25. 50. 75. 100.

125.

150.

175.

200.

225.

β (m) β x β y