0.0 100. 200. 300. 400. 500. 600. 700. 800. 900. 1000. s (m) δE/ p 0c = 0. Table name = TWISS

Injector + Linac FACET2 e- (May 18, 2021) Unix version 8.52/0s 18/05/21 15.00.40

0.0 1. 2. 3. 4. 5. 6. 7. 8. 9. 10.

E[GeV]

0.0 100. 200. 300. 400. 500. 600. 700. 800. 900. 1000. s (m) δE/ p 0c = 0. Table name = TWISS

Injector + Linac FACET2 e- (May 18, 2021) Unix version 8.52/0s 18/05/21 15.00.40

0.0 10. 20. 30. 40. 50. 60. 70. 80. 90. 100.

110.

120.

130.

β (m)

β x β y

0.0 200. 400. 600. 800. 1000. s (m) δE/ p 0c = 0. Table name = TWISS

Injector + Linac FACET2 e- (May 18, 2021) Unix version 8.52/0s 18/05/21 15.00.40

-0.50

-0.45

-0.40

-0.35

-0.30

-0.25

-0.20

-0.15

-0.10

-0.05 0.0

D (m)

Dx Dy

920. 925. 930. 935. 940. 945. 950. 955. 960. 965. 970. 975. s (m) δE/ p 0c = 0. Table name = TWISS

BC20 FACET2 e- (May 18, 2021) Unix version 8.52/0s 18/05/21 15.00.40

0.0 20. 40. 60. 80. 100.

120.

140.

160.

180.

200.

β (m)

β x β y

920. 925. 930. 935. 940. 945. 950. 955. 960. 965. 970. 975. s (m) δE/ p 0c = 0. Table name = TWISS

BC20 FACET2 e- (May 18, 2021) Unix version 8.52/0s 18/05/21 15.00.40

-0.5

-0.4

-0.3

-0.2

-0.1 0.0 0.1 0.2

D (m)

Dx Dy

970. 975. 980. 985. 990. 995. 1000. 1005. 1010. 1015. s (m) δE/ p 0c = 0. Table name = TWISS

Final Focus + Spectrometer FACET2 e- (May 18, 2021) Unix version 8.52/0s 18/05/21 15.00.40

0.0 1. 2. 3. 4. 5. 6. 7. 8. 9. 10. 11.

β^{1/ 2} (m^{1/ 2})

β x^{1/ 2} β y^{1/ 2}

970. 975. 980. 985. 990. 995. 1000. 1005. 1010. 1015. s (m) δE/ p 0c = 0. Table name = TWISS

Final Focus + Spectrometer FACET2 e- (May 18, 2021) Unix version 8.52/0s 18/05/21 15.00.40

0.0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

D (m)

Dx Dy