700. 725. 750. 775. 800. 825. 850. 875. 900. 925. 950. 975. s (m) δE/ p 0c = 0. Table name = TWISS

FACET2 e- (December 22, 2017) Windows version 8.52/0s 20/12/17 11.01.36

0.0 2.5 5.0 7.5 10.0

12.5

15.0

17.5

20.0

22.5

25.0 β (m) [*10**( 3)] β x β y

0.0 100. 200. 300. 400. 500. 600. 700. 800. 900. 1000. s (m) δE/ p 0c = 0. Table name = TWISS

FACET2 e- (December 22, 2017) Windows version 8.52/0s 20/12/17 11.01.36

0.0 1. 2. 3. 4. 5. 6. 7. 8. 9. 10. 11.

E[GeV]

0.0 200. 400. 600. 800. 1000. s (m) δE/ p 0c = 0. Table name = TWISS

FACET2 e- (December 22, 2017) Windows version 8.52/0s 20/12/17 11.01.36

0.0 2.5 5.0 7.5 10.0

12.5

15.0

17.5

20.0

22.5

25.0 β (m) [*10**( 3)] β x β y

0.0 200. 400. 600. 800. 1000. s (m) δE/ p 0c = 0. Table name = TWISS

FACET2 e- (December 22, 2017) Windows version 8.52/0s 20/12/17 11.01.36

-0.5

-0.4

-0.3

-0.2

-0.1

0.0

0.1

0.2

D (m)

Dx Dy