8. 10. 12. 14. 16. 18. 20. 22. 24. s (m) δE/ p 0c = 0. Table name = TWISS

Cathode through 135-MeV Spectrometer LCLS: LCLS24OCT13 design Mac OSX version 8.51/15 09/04/14 17.45.29

0.0 2.5 5.0 7.5 10.0

12.5

15.0

17.5

20.0

22.5

25.0 β (m)

-1.6

-1.4

-1.2

-1.0

-0.8

-0.6

-0.4

-0.2 0.0

Dx (m) β x β y Dx

17.0 17.5 18.0 18.5 19.0 19.5 20.0 20.5 21.0 21.5 22.0 22.5 s (m) δE/ p 0c = 0. Table name = TWISS

BXS Entrance to 135-MeV Spectrometer LCLS: LCLS24OCT13 design Mac OSX version 8.51/15 09/04/14 17.45.29

0.0 2.25

4.50

6.75

9.00

11.25

13.50

15.75

18.00

20.25

22.50 β (m)

-1.6

-1.4

-1.2

-1.0

-0.8

-0.6

-0.4

-0.2 0.0

Dx (m) β x β y Dx