685. 690. 695. 700. 705. 710. 715. 720. 725. s (m) δE/ p 0c = 0. Table name = TWISS

Turned-off BYD1 to Safety Dump LCLS: LCLS24OCT13 design Mac OSX version 8.51/15 11/04/14 11.25.42

0.0 50. 100.

150.

200.

250.

300.

350.

400.

450.

500.

β (m)

0.0 0.025

0.050

0.075

0.100

0.125

0.150

0.175

0.200

0.225

0.250

0.275

0.300

Dx (m) β x β y Dx