-1.00 -0.50 0.0 0.50 1.00 1.50 2.00 s (m) δE/ p 0c = 0. Table name = TWISS

Cathode through 6-MeV Gun Spectrometer LCLS (December 22, 2017) Unix version 8.52/0s 24/01/18 11.15.46

0.0

5.

10.

15.

20.

25.

30.

β (m)

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

Dx (m) β x β y Dx