300. 400. 500. 600. 700. 800. 900. 1000. 1100. s (m) δE/ p 0c = 0. Table name = TWISS

SC linac: L4 to bypass line AD_ACCEL_HE (September 30, 2020) Unix version 8.52/0s 29/09/20 15.17.48

0.0 5. 10. 15. 20. 25. 30. 35. 40. 45. 50. 55. 60. 65.

β (m) β x β y

0.0 500. 1000. 1500. 2000. 2500. 3000. 3500. 4000. s (m) δE/ p 0c = 0. Table name = TWISS

SC-linac to SXR dump AD_ACCEL_HE (September 30, 2020) Unix version 8.52/0s 29/09/20 15.17.48

0.0 1. 2. 3. 4. 5. 6. 7. 8. 9. 10.

E[GeV]

0.0 500. 1000. 1500. 2000. 2500. 3000. 3500. 4000. s (m) δE/ p 0c = 0. Table name = TWISS

SC-linac to SXR dump AD_ACCEL_HE (September 30, 2020) Unix version 8.52/0s 29/09/20 15.17.48

0.0 50. 100.

150.

200.

250.

300.

350.

400.

450.

500.

β (m) β x β y

0.0 500. 1000. 1500. 2000. 2500. 3000. 3500. 4000. s (m) δE/ p 0c = 0. Table name = TWISS

SC-linac to SXR dump AD_ACCEL_HE (September 30, 2020) Unix version 8.52/0s 29/09/20 15.17.48

-0.6

-0.4

-0.2 0.0 0.2 0.4 0.6 0.8 1.0

D (m)

Dx Dy

3350. 3400. 3450. 3500. 3550. 3600. 3650. 3700. 3750. s (m) δE/ p 0c = 0. Table name = TWISS

VBEND to SXR dump AD_ACCEL_HE (September 30, 2020) Unix version 8.52/0s 29/09/20 15.17.48

0.0 10. 20. 30. 40. 50. 60. 70. 80.

β (m) β x β y