/afs/slac.stanford.edu/u/sf/cottrell/frame/lan97.frame 6 of 10 David Millsom and Les Cottrell

SLAC Switched Network - Spring 1997

Router

10BaseT Shared

Legend

Gigaswitch

Fiber/FDDI

UTP5 (Cu)

Concentrator

FDDI

File

100/10Base Ethernet switch

Tape Servers

Batch Compute Farm

SLD

ESA

DMZ

100BaseFL

10BaseT 100BaseT(full duplex)

(full duplex)

FDDI Ring servers

Interactive Farm

CGB3 TEST FARM 1&2 SERV 1&2 EP CL CLA CL-CLA AE ELA IR2 MCC1 MCC3

MCC2 MCC4

Server Farm

VMS CLUSTER

CGB1 CGB2 LEGACY

Core Switches/ Routers

Remote Switches

Main Contr ol Center (MCC)

CGB4 CGB5

CGB-MAIN

RTR- CGB2 ESA CL CEH

Internet

100 Mbps FDX on fiber

Repeater Hub